From 7103019890960e793deefb64987a09b33be60b42 Mon Sep 17 00:00:00 2001
From: Michael Hunteman <michael@huntm.net>
Date: Fri, 17 May 2024 15:20:30 -0700
Subject: Add golang server

---
 src/components/Registry.tsx | 11 -----------
 1 file changed, 11 deletions(-)
 delete mode 100644 src/components/Registry.tsx

(limited to 'src/components/Registry.tsx')

diff --git a/src/components/Registry.tsx b/src/components/Registry.tsx
deleted file mode 100644
index 60a73f9..0000000
--- a/src/components/Registry.tsx
+++ /dev/null
@@ -1,11 +0,0 @@
-import React from 'react';
-
-function Registry() {
-  return (
-    <>
-      <p>Registry</p>
-    </>
-  );
-}
-
-export default Registry;
-- 
cgit v1.2.3

